; Step9LT.def : Declares the module parameters for the DLL.

LIBRARY      "Step9LT"
DESCRIPTION  'Step9LT Windows Dynamic Link Library'

EXPORTS
  LIBRARYID    @1
  LIBRARYENTRY @2